<template>
  <ContentWrap>
    <!-- 搜索工作栏 -->
    <el-form
      class="-mb-15px"
      :model="queryParams"
      ref="queryFormRef"
      :inline="true"
      label-width="68px"
    >
      <el-form-item label="项目" prop="contractName">
        <el-input
          v-model="queryParams.contractName"
          placeholder="请输入项目"
          clearable
          @keyup.enter="handleQuery"
          class="!w-240px"
        />
      </el-form-item>
      <el-form-item label="任务" prop="taskName">
        <el-input
          v-model="queryParams.taskName"
          placeholder="请输入任务"
          clearable
          @keyup.enter="handleQuery"
          class="!w-240px"
        />
      </el-form-item>
      <el-form-item label="创建时间" prop="createTime">
        <el-date-picker
          v-model="queryParams.createTime"
          value-format="YYYY-MM-DD HH:mm:ss"
          type="daterange"
          start-placeholder="开始日期"
          end-placeholder="结束日期"
          :default-time="[new Date('1 00:00:00'), new Date('1 23:59:59')]"
          class="!w-220px"
        />
      </el-form-item>
      <el-form-item>
        <el-button @click="handleQuery"><Icon icon="ep:search" class="mr-5px" /> 搜索</el-button>
        <el-button @click="resetQuery"><Icon icon="ep:refresh" class="mr-5px" /> 重置</el-button>
        <el-button
          type="primary"
          plain
          @click="openForm('create')"
          v-hasPermi="['pms:iot-rd-daily-report:create']"
        >
          <Icon icon="ep:plus" class="mr-5px" /> 新增
        </el-button>
        <el-button
          type="success"
          plain
          @click="handleExport"
          :loading="exportLoading"
          v-hasPermi="['pms:iot-rd-daily-report:export']"
        >
          <Icon icon="ep:download" class="mr-5px" /> 导出
        </el-button>
      </el-form-item>
    </el-form>
  </ContentWrap>

  <!-- 列表 -->
  <ContentWrap ref="tableContainerRef">
    <el-table ref="tableRef" v-loading="loading" :data="list" :stripe="true" :show-overflow-tooltip="true">
      <el-table-column label="主键id" align="center" prop="id" v-if="false"/>
      <el-table-column
        label="创建时间"
        align="center"
        prop="createTime"
        :formatter="dateFormatter"
        :width="columnWidths.createTime"
      />
      <el-table-column label="施工队伍" align="center" prop="deptName" :width="columnWidths.deptName"/>
      <el-table-column label="项目" align="center" prop="contractName" :width="columnWidths.contractName"/>
      <el-table-column label="任务" align="center" prop="taskName" :width="columnWidths.taskName"/>
      <el-table-column label="时间节点" align="center" prop="timeRange" :width="columnWidths.timeRange"/>
      <el-table-column :label="t('project.status')" align="center" prop="rdStatus" :width="columnWidths.rdStatus">
        <template #default="scope">
          <dict-tag :type="DICT_TYPE.PMS_PROJECT_RD_STATUS" :value="scope.row.rdStatus" />
        </template>
      </el-table-column>
      <!--
      <el-table-column label="项目类别(钻井 修井 注氮 酸化压裂... )" align="center" prop="projectClassification" />
      <el-table-column label="施工工艺" align="center" prop="techniqueIds" /> -->
      <!--
      <el-table-column label="施工设备" align="center" prop="deviceIds" /> -->
      <!--
      <el-table-column label="时间节点-结束" align="center" prop="endTime" /> -->
      <el-table-column label="当日施工井" align="center" prop="cumulativeWorkingWell" :width="columnWidths.cumulativeWorkingWell"/>
      <el-table-column label="当日施工层" align="center" prop="cumulativeWorkingLayers" :width="columnWidths.cumulativeWorkingLayers"/>
      <el-table-column label="当日泵车台次" align="center" prop="dailyPumpTrips" :width="columnWidths.dailyPumpTrips"/>
      <el-table-column label="当日仪表/混砂" align="center" prop="dailyToolsSand" :width="columnWidths.dailyToolsSand"/>
      <el-table-column label="趟数" align="center" prop="runCount" :width="columnWidths.runCount"/>
      <el-table-column label="桥塞" align="center" prop="bridgePlug" :width="columnWidths.bridgePlug"/>
      <el-table-column label="水方量" align="center" prop="waterVolume" :width="columnWidths.waterVolume"/>
      <el-table-column label="时间H" align="center" prop="hourCount" :width="columnWidths.hourCount"/>
      <el-table-column
        label="施工开始日期"
        align="center"
        prop="constructionStartDate"
        :formatter="dateFormatter"
        :width="columnWidths.constructionStartDate"
      />
      <el-table-column
        label="施工结束日期"
        align="center"
        prop="constructionEndDate"
        :formatter="dateFormatter"
        :width="columnWidths.constructionEndDate"
      />
      <el-table-column label="当日生产动态" align="center" prop="productionStatus" :width="columnWidths.productionStatus"/>
      <el-table-column label="下步工作计划" align="center" prop="nextPlan" :width="columnWidths.nextPlan"/>
      <el-table-column label="外租设备" align="center" prop="externalRental" :width="columnWidths.externalRental"/>
      <el-table-column label="故障情况" align="center" prop="malfunction" :width="columnWidths.malfunction"/>
      <el-table-column label="故障误工H" align="center" prop="faultDowntime" :width="columnWidths.faultDowntime"/>

      <el-table-column label="操作" align="center" min-width="120px" fixed="right">
        <template #default="scope">
          <el-button
            link
            type="success"
            @click="handleDetail(scope.row.id)"
            v-hasPermi="['pms:iot-rd-daily-report:query']"
          >
            查看
          </el-button>
          <el-button
            link
            type="warning"
            @click="handleApprove(scope.row.id)"
            v-hasPermi="['pms:iot-rd-daily-report:update']"
            v-if="scope.row.auditStatus === 10"
          >
            审批
          </el-button>
        </template>
      </el-table-column>
    </el-table>
    <!-- 分页 -->
    <Pagination
      :total="total"
      v-model:page="queryParams.pageNo"
      v-model:limit="queryParams.pageSize"
      @pagination="getList"
    />
  </ContentWrap>

  <!-- 表单弹窗：添加/修改 -->
  <IotRdDailyReportForm ref="formRef" @success="getList" />
</template>

<script setup lang="ts">
import { dateFormatter } from '@/utils/formatTime'
import download from '@/utils/download'
import { IotRdDailyReportApi, IotRdDailyReportVO } from '@/api/pms/iotrddailyreport'
import IotRdDailyReportForm from './IotRdDailyReportForm.vue'
import {DICT_TYPE} from "@/utils/dict";
import { useRoute } from 'vue-router'


/** 瑞都日报 列表 */
defineOptions({ name: 'IotRdDailyReport' })

const message = useMessage() // 消息弹窗
const { t } = useI18n() // 国际化
const { push } = useRouter() // 路由跳转
const loading = ref(true) // 列表的加载中
const list = ref<IotRdDailyReportVO[]>([]) // 列表的数据
const total = ref(0) // 列表的总页数

const route = useRoute() // 路由信息

const queryParams = reactive({
  pageNo: 1,
  pageSize: 10,
  deptId: undefined,
  projectId: undefined,
  contractName: undefined,
  taskId: undefined,
  taskName: undefined,
  projectClassification: undefined,
  techniqueIds: undefined,
  deviceIds: undefined,
  startTime: [],
  endTime: [],
  cumulativeWorkingWell: undefined,
  cumulativeWorkingLayers: undefined,
  dailyPumpTrips: undefined,
  dailyToolsSand: undefined,
  runCount: undefined,
  bridgePlug: undefined,
  waterVolume: undefined,
  hourCount: undefined,
  dailyFuel: undefined,
  dailyPowerUsage: undefined,
  productionTime: [],
  nonProductionTime: [],
  rdNptReason: undefined,
  constructionStartDate: [],
  constructionEndDate: [],
  productionStatus: undefined,
  externalRental: undefined,
  nextPlan: undefined,
  rdStatus: undefined,
  malfunction: undefined,
  faultDowntime: [],
  personnel: undefined,
  totalStaffNum: undefined,
  leaveStaffNum: undefined,
  extProperty: undefined,
  sort: undefined,
  remark: undefined,
  status: undefined,
  processInstanceId: undefined,
  auditStatus: undefined,
  createTime: [],
})
const queryFormRef = ref() // 搜索的表单
const exportLoading = ref(false) // 导出的加载中

// 表格引用
const tableRef = ref()
// 表格容器引用
const tableContainerRef = ref()

// 列宽度配置
const columnWidths = ref({
  id: '80px',
  deptName: '120px',
  contractName: '120px',
  taskName: '120px',
  timeRange: '120px',
  rdStatus: '120px',
  cumulativeWorkingWell: '120px',
  cumulativeWorkingLayers: '120px',
  dailyPumpTrips: '120px',
  dailyToolsSand: '120px',
  runCount: '80px',
  bridgePlug: '80px',
  waterVolume: '100px',
  hourCount: '80px',
  constructionStartDate: '180px',
  constructionEndDate: '180px',
  productionStatus: '200px',
  nextPlan: '200px',
  externalRental: '120px',
  malfunction: '150px',
  faultDowntime: '120px',
  createTime: '180px',
  operation: '120px'
})

// 计算文本宽度
const getTextWidth = (text: string, fontSize = 14) => {
  const span = document.createElement('span');
  span.style.visibility = 'hidden';
  span.style.position = 'absolute';
  span.style.whiteSpace = 'nowrap';
  span.style.fontSize = `${fontSize}px`;
  span.style.fontFamily = 'inherit';
  span.innerText = text;

  document.body.appendChild(span);
  const width = span.offsetWidth;
  document.body.removeChild(span);

  return width;
};

// 计算列宽度
const calculateColumnWidths = () => {
  const MIN_WIDTH = 80; // 最小列宽
  const PADDING = 25; // 列内边距

  // 确保表格容器存在
  if (!tableContainerRef.value?.$el) return;

  const newWidths: Record<string, string> = {};

  // 计算各列宽度的函数
  const calculateColumnWidth = (key: string, label: string, getValue: Function) => {
    const headerWidth = getTextWidth(label) + PADDING;
    let contentMaxWidth = MIN_WIDTH;

    // 计算内容最大宽度
    list.value.forEach((row, index) => {
      let text = '';
      if (key === 'rdStatus') {
        // 特殊处理字典列，这里简化处理，实际应该获取字典标签
        text = String(row[key] || '');
      } else if (key.includes('Date') || key === 'createTime') {
        // 日期列使用格式化后的值
        text = dateFormatter(null, null, row[key]) || '';
      } else {
        text = String(getValue ? getValue(row, index) : (row[key] || ''));
      }

      const textWidth = getTextWidth(text) + PADDING;
      if (textWidth > contentMaxWidth) contentMaxWidth = textWidth;
    });

    // 取标题宽度和内容最大宽度的较大值
    const finalWidth = Math.max(headerWidth, contentMaxWidth, MIN_WIDTH);
    newWidths[key] = `${finalWidth}px`;
  };

  // 计算各列宽度
  calculateColumnWidth('deptName', '施工队伍', (row: any) => row.deptName);
  calculateColumnWidth('contractName', '项目', (row: any) => row.contractName);
  calculateColumnWidth('taskName', '任务', (row: any) => row.taskName);
  calculateColumnWidth('timeRange', '时间节点', (row: any) => row.timeRange);
  calculateColumnWidth('rdStatus', t('project.status'), (row: any) => row.rdStatus);
  calculateColumnWidth('cumulativeWorkingWell', '累计施工井', (row: any) => row.cumulativeWorkingWell);
  calculateColumnWidth('cumulativeWorkingLayers', '累计施工层', (row: any) => row.cumulativeWorkingLayers);
  calculateColumnWidth('dailyPumpTrips', '当日泵车台次', (row: any) => row.dailyPumpTrips);
  calculateColumnWidth('dailyToolsSand', '当日仪表/混砂', (row: any) => row.dailyToolsSand);
  calculateColumnWidth('runCount', '趟数', (row: any) => row.runCount);
  calculateColumnWidth('bridgePlug', '桥塞', (row: any) => row.bridgePlug);
  calculateColumnWidth('waterVolume', '水方量', (row: any) => row.waterVolume);
  calculateColumnWidth('hourCount', '时间H', (row: any) => row.hourCount);
  calculateColumnWidth('constructionStartDate', '施工开始日期', (row: any) => dateFormatter(null, null, row.constructionStartDate));
  calculateColumnWidth('constructionEndDate', '施工结束日期', (row: any) => dateFormatter(null, null, row.constructionEndDate));
  calculateColumnWidth('productionStatus', '当日生产动态', (row: any) => row.productionStatus);
  calculateColumnWidth('nextPlan', '下步工作计划', (row: any) => row.nextPlan);
  calculateColumnWidth('externalRental', '外租设备', (row: any) => row.externalRental);
  calculateColumnWidth('malfunction', '故障情况', (row: any) => row.malfunction);
  calculateColumnWidth('faultDowntime', '故障误工H', (row: any) => row.faultDowntime);
  calculateColumnWidth('createTime', '创建时间', (row: any) => dateFormatter(null, null, row.createTime));

  // 操作列固定宽度
  newWidths.operation = '120px';
  // id列固定宽度（虽然隐藏）
  newWidths.id = '80px';

  // 更新列宽配置
  columnWidths.value = newWidths;

  // 触发表格重新布局
  nextTick(() => {
    tableRef.value?.doLayout();
  });
};

/** 查询列表 */
const getList = async () => {
  loading.value = true
  try {
    const data = await IotRdDailyReportApi.getIotRdDailyReportPage(queryParams)
    list.value = data.list
    total.value = data.total
    // 获取数据后计算列宽
    nextTick(() => {
      calculateColumnWidths();
    });
  } finally {
    loading.value = false
  }
}

/** 搜索按钮操作 */
const handleQuery = () => {
  queryParams.pageNo = 1
  getList()
}

/** 重置按钮操作 */
const resetQuery = () => {
  queryFormRef.value.resetFields()
  handleQuery()
}

/** 添加/修改操作 */
const formRef = ref()
const openForm = (type: string, id?: number) => {
  formRef.value.open(type, id)
}

/** 查看日报详情 */
const handleDetail = async (id: number) => {
  try {
    // 跳转到 FillDailyReportForm 页面，传递审批模式和ID
    push({
      name: 'FillDailyReportForm',
      params: {
        id: id.toString(),
        mode: 'detail'  // 添加详情模式标识
      }
    })
  } catch (error) {
    console.error('跳转详情页面失败:', error)
  }
}

/** 审批按钮操作 */
const handleApprove = async (id: number) => {
  try {
    // 跳转到 FillDailyReportForm 页面，传递审批模式和ID
    push({
      name: 'FillDailyReportForm',
      params: {
        id: id.toString(),
        mode: 'approval'  // 添加审批模式标识
      }
    })
  } catch (error) {
    console.error('跳转审批页面失败:', error)
  }
}

/** 删除按钮操作 */
const handleDelete = async (id: number) => {
  try {
    // 删除的二次确认
    await message.delConfirm()
    // 发起删除
    await IotRdDailyReportApi.deleteIotRdDailyReport(id)
    message.success(t('common.delSuccess'))
    // 刷新列表
    await getList()
  } catch {}
}

/** 导出按钮操作 */
const handleExport = async () => {
  try {
    // 导出的二次确认
    await message.exportConfirm()
    // 发起导出
    exportLoading.value = true
    const data = await IotRdDailyReportApi.exportIotRdDailyReport(queryParams)
    download.excel(data, '瑞都日报.xls')
  } catch {
  } finally {
    exportLoading.value = false
  }
}

// 声明 ResizeObserver 实例
let resizeObserver: ResizeObserver | null = null;

/** 初始化 **/
onMounted(() => {
  // 检查是否有路由参数传递过来的 wellName
  if (route.query.wellName) {
    queryParams.taskName = route.query.wellName as string
  }
  getList()
  // 创建 ResizeObserver 监听表格容器尺寸变化
  if (tableContainerRef.value?.$el) {
    resizeObserver = new ResizeObserver(() => {
      // 使用防抖避免频繁触发
      clearTimeout((window as any).resizeTimer);
      (window as any).resizeTimer = setTimeout(() => {
        calculateColumnWidths();
      }, 100);
    });
    resizeObserver.observe(tableContainerRef.value.$el);
  }
})

onUnmounted(() => {
  // 清除 ResizeObserver
  if (resizeObserver && tableContainerRef.value?.$el) {
    resizeObserver.unobserve(tableContainerRef.value.$el);
    resizeObserver = null;
  }

  // 清除定时器
  if ((window as any).resizeTimer) {
    clearTimeout((window as any).resizeTimer);
  }
})

// 监听列表数据变化重新计算列宽
watch(list, () => {
  nextTick(calculateColumnWidths)
}, { deep: true })
</script>

<style scoped>
/* 确保表格单元格内容不换行 */
:deep(.el-table .cell) {
white-space: nowrap;
}

/* 确保表格列标题不换行 */
:deep(.el-table th > .cell) {
white-space: nowrap;
}

/* 调整表格最小宽度，确保内容完全显示 */
:deep(.el-table) {
min-width: 100%;
}
</style>
